*CW Operation



            `keyword(Transmit / Receive Switching,*CW Switching);
            `keyword(Calling CQ on CW,*Calling CQ on CW);
            `keyword(Calling Another Station on CW,*Calling Another Station on CW);
            `keyword(Changing Speed,*Changing Speed);



    This section gives an overview on CW operation using XPCOM.


















*CW Switching


    To switch to Transmit.

        Press the Page Up Key.

    To switch to Receive.

        Press the Page Down Key.





















*Calling CQ on CW



      To call an automatic CQ press the F5 function key.  This will start
      the CQ sequence as described in the Setup Menu section of this
			document.  To abort the CQ press F5 key.




















*Calling Another Station on CW

		1.  Press the F2 key and enter the other stations call.

		2.  Press the 'ALT F5' keys to send a call in the form of:
				"W0AAA W0AAA W0AAA DE W0BBB W0BBB W0BBB KKK".






















*Changing Speed

	 To Change the Transmit CW Speed

			Press 'ALT +' to increase transmit speed by one WPM (NORMAL Keys).
			Press 'ALT -' to decrease transmit speed by one WPM (NORMAL Keys).

	 Receive Speed (CW Only)

			To Lock the receive speed at current value, press F9.
			To Unlock the speed,  press F9 again.










